---
title: "Hardware Build Guide"
description: "How to build your Language Model Computer"
---

## 01 Light

### Materials

- ATOM Echo Smart Speaker Development Kit
- PowerBoost 1000 Charger
- Tactile Switches 12MM TACTILE PB SWITCH
- Slide Switches DPDT THRU HOLE .3A
- Lithium Ion Polymer Battery - 3.7v 500mAh
- Silicone Cover Stranded-Core Wire 26AWG - Black, Red, Yellow
- Premium Male/Male Jumper Wires - 20 x 3" (75mm)

Optional

- Adafruit Mono 2.5W Class D Audio Amplifier - PAM8302

### Assembly

1. Gather Materials
2. Shove em together

## 01 Heavy

Coming soon
